5.4 5.45 5.5 5.55 5.6 5.65 5.7 x 10^5

-5500

-5000

-4500

-4000

-3500

-3000

-2500

-2000

-1500

-1000

-500

0

Scer chr8

YHRCTY1-1

YHR214C-B

YHR214C-C

YHRCDELTA16

YHR215W (PHO12)

YHR216W (PUR5)

YHR217C

YHR218W

YHR219W

Scer ChrVIII tile 12 positions 550kbp to 562kbp aligned against Spar Smik Sbay