1.9 1.95 2 2.05 2.1 2.15 2.2 2.25 2.3 2.35 2.4 x 10^5

-5500

-5000

-4500

-4000

-3500

-3000

-2500

-2000

-1500

-1000

-500

0

Scer chr1

YAR044W (OSH1)

YAR047C

YAR050W (FLO1)

YAR053W

YARCDELTA8

YAR060C

YAR061W

YAR062W

YAR064W

YAR066W

YAR068W

YAR069C

YAR070C

YAR071W (PHO11)

YAR073W

YAR075W

Scer ChrI tile 5 positions 200kbp to 230kbp aligned against Spar Smik Sbay